0.7 0.8 0.9 1 1.1

)^2c Counts / (0.01 GeV/

0 10 20 30 40 310 ×

)^+π^− (K

−π^+ K

→) ^0*K (^0K*

ALICE = 5.02 TeV (0-10%) NNs Pb −p (a)

)^2c

(GeV/ πKM 0.7 0.8 0.9 1 1.1

)^2c Counts / (0.01 GeV/

0 5 10 15 20 25 310 × Data (stat. uncert.) Breit-Wigner Peak Fit Residual BG (c) 3 x10 0.98 1 1.02 1.04 1.06 1.08 1.1

)^2c

Counts / (0.001 GeV/

0

5

10

15 310 × − K^+ K →ϕ < 0 y -0.3 < c < 3.0 GeV/ Tp≤ 2.2 (b)

)^2c

(GeV/ KK M 0.98 1 1.02 1.04 1.06 1.08 1.1

)^2c

Counts / (0.001 GeV/

0

5

10

15 310 × < 0.3 y 0 < Data (stat. uncert.) Voigtian Peak Fit Residual BG

(d) 3 x10

ALI-PUB-561579

ALI-PUB-561579